\batchmode\nonstopmode\showboxbreadth=0\showboxdepth=0
\newcommand{\smaller}{\footnotesize}
\newcommand{\smallest}{\scriptsize}
\setlength{\textwidth}{5.75in}
\setlength{\oddsidemargin}{0.37in}
\setlength{\evensidemargin}{0.37in}
\addtolength{\textheight}{.5in}
\addtolength{\topmargin}{-.5in}
\setlength{\marginparwidth}{0.8in}
