% Document Type: LaTeX
% Master File: biblist.tex
% Created by Richard Hughey rph@ce.ucsc.edu
% Bibliography printing routine.  Main feature is redefinition
% of \thebiblopgraphy to remove \section* command.
% Uses wide page.

\documentstyle{article}

\setlength{\textwidth}{6.5in}
\setlength{\oddsidemargin}{0in}
\setlength{\evensidemargin}{0in}
\addtolength{\textheight}{.5in}
\addtolength{\topmargin}{-.5in}
\setlength{\marginparwidth}{0.8in}

\def\thebibliography#1{\list
 {[\arabic{enumi}]}{\settowidth\labelwidth{[#1]}\leftmargin\labelwidth
 \advance\leftmargin\labelsep
 \usecounter{enumi}}
 \def\newblock{\hskip .11em plus .33em minus .07em}
 \sloppy\clubpenalty4000\widowpenalty4000
 \sfcode`\.=1000\relax}
\let\endthebibliography=\endlist
\title{Bibliography}
\author{}

\begin{document}
\maketitle
\bibliographystyle{annotatea}
\nocite{*}
\bibliography{my_bib_files}
\end{document}


